[eV/cm s sr]

Log JE

9 10 11 12 13

8 9 10 11 12

[eV]

Avg E

2 3

4

2 3

4

Electrons

Ions

2

3

4

2

3

4

Electrons

2

3

4

2

3

4

Ions

13:01:00 79.5 305.3 85.5 13:15

13:02 77.3 291.3 85.9 10:28

13:03 74.6 281.7 84.3 08:20

13:04 71.6 274.9 81.7 07:18

13:05 68.4 270.0 78.8 06:47

13:06 65.2 266.2 75.8 06:28

13:07 61.8 263.2 72.7 06:15

13:08 58.5 260.8 69.5 06:06

13:09:00

55.1 258.7 66.2 05:60

UT LAT LON MLAT MLT

[eV]

Log Energy

5

6

7

8

9

10 eV cm s sr

___eV___

Flux

Energy Log

3

4

5

6

7

8

electrons ions

[ ]

F17 2010/18 1 18

JHU/APL