[eV/cm s sr]

Log JE

9 10 11 12 13

8 9 10 11 12

[eV]

Avg E

2 3

4

2 3

4

Electrons

Ions

2

3

4

2

3

4

Electrons

2

3

4

2

3

4

Ions

13:28:00 78.5 290.8 86.9 11:35

13:29 76.0 279.3 85.5 08:34

13:30 73.1 271.3 82.9 07:21

13:31 70.0 265.6 79.9 06:49

13:32 66.8 261.3 76.7 06:31

13:33 63.5 258.0 73.5 06:20

13:34 60.2 255.3 70.3 06:13

13:35 56.8 253.1 66.9 06:07

13:36:00

53.4 251.2 63.6 06:03

UT LAT LON MLAT MLT

[eV]

Log Energy

5

6

7

8

9

10 eV cm s sr

___eV___

Flux

Energy Log

3

4

5

6

7

8

electrons ions

[ ]

F17 2009/357 12 23

JHU/APL